)c (GeV/ Tp 0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8

c Raw counts per 0.1 GeV/

0 5 10 15 20 25 30 35

70-90%

OS dimuons (data) ψ Coherent photoproduced J/

= 2.76 TeV NNs ALICE, Pb-Pb < 4 y 2.5 < 2c < 3.4 GeV/

-μ^+μm

2.8 <